<!-- <template>
  <div ref="chartRef" :style="{ height, width }"></div>
</template> -->
<template>
  <div ref="chartRef" style="width: 100%; height: 260px"></div>
</template>
<script>
import { ref, reactive, watch, watchEffect } from 'vue';
import { cloneDeep } from 'lodash';
import { useEcharts } from '@/hooks/useEcharts';

export default {
  name: 'CustomEchartLineLine',
  props: {
    chartData: {
      type: Array,
      default: () => [],
    },
    size: {
      type: Object,
      default: () => {},
    },
    option: {
      type: Object,
      default: () => ({}),
    },
    width: {
      type: String,
      default: '100%',
    },
    height: {
      type: String,
      default: 'calc(100vh - 78px)',
    },
  },
  emits: ['click'],
  setup(props, { emit }) {
    const chartRef = ref(null);
    const { setOptions, getInstance, resize, startAutoPlay } = useEcharts(chartRef);
    const optionVal = reactive({});

    watchEffect(() => {
      props.option && initCharts();
    });

    watch(
      () => props.size,
      () => {
        resize();
      },
      {
        immediate: true,
      }
    );

    function initCharts() {
      if (props.option) {
        Object.assign(optionVal, cloneDeep(props.option));
      }
      setOptions(props.option);
      startAutoPlay({
        interval: 2000,
        seriesIndex: 0,
        showTooltip: true,
      });
      resize();
      getInstance()?.off('click', onClick);
      getInstance()?.on('click', onClick);
    }

    function onClick(params) {
      emit('click', params);
    }

    return { chartRef };
  },
};
</script>
